<Note type="info">
  📢 Announcing our research paper: Mem0 achieves <strong>26%</strong> higher accuracy than OpenAI Memory, <strong>91%</strong> lower latency, and <strong>90%</strong> token savings! [Read the paper](https://mem0.ai/research) to learn how we're revolutionizing AI agent memory.
</Note>